290 295 300 305 310 315 320

1.4

1.0

0.6

IF 4(V) IF 5(V)

20

-20

Plot file version 83 created 20-MAR-2025 14:37:35 FLUX2025-P.SMTYFG.1 Bandpass table # 4

Lower frame: BP ampl Top frame: BP phase Bandpass table spectrum Antenna: E09 (21)

E09 21

Frequency MHz

290 295 300 305 310 315 320

1.4

1.0

0.6

IF 4(H) IF 5(H)

200 160 E09 21