Power db vs UTC time for ACUTST-MAR04.L-BAND.1 SN 4 Rpol IF 1

Plot file version 53 created 05-MAR-2015 10:14:54

14R E08

-1.0 -1.5 -2.0 -2.5 -3.0 -3.5 -4.0 -4.5 -5.0 -5.5 -6.0

15R E24 db

Time (hours)

23 13 52 54 56 58 14 00 02 04

-1.0 -1.5 -2.0 -2.5 -3.0 -3.5 -4.0 -4.5 -5.0 -5.5 -6.0