Gain amp vs elevation for 3BIT-17NOV.A1C1AP.1 SN 4

Plot file version 4 created 21-NOV-2011 17:02:36

N03 ( 6) R IF= 7 +0.9903E+00 + 0.425E-03*ZA - 0.441E-05*ZA**2 1010 1005 1000 995 990 N03 ( 6) L IF= 7 +0.9892E+00 + 0.420E-03*ZA - 0.348E-05*ZA**2

1010 1005 1000 995 990 N03 ( 6) R IF= 8 +0.9900E+00 + 0.470E-03*ZA - 0.543E-05*ZA**2

MilliGain

1015 1010 1005 1000 995 990 985 N03 ( 6) L IF= 8 +0.9927E+00 + 0.290E-03*ZA - 0.252E-05*ZA**2

Elevation (degrees)

20 30 40 50 60 70 80

1010 1005 1000 995 990 985