IF 1 CHAN 1 STK RR

Amplitude andPhase vs Time for 20090416.C BAND.1 CL # 1

PLot file version 3 created 17-APR-2009 14:26:37

0.6 0.4 0.2 0.0

EVLA:W16 - EVLA:N8 ( 1 - 28 )

100 50 0 -50

Janskys

1.0 0.5 0.0

EVLA:E16 - EVLA:N8 ( 3 - 28 )

200 100 0 -100 0.4 0.2 0.0

VLA:_E8 - EVLA:N8 ( 10 - 28 )

Degrees

TIME (HOURS)

15 22 23 24 25 26

60 40 20 0 -20