Gain amp vs IAT time for 20061005.X BAND.1 SN 3 Rpol & Lpol IF 1 - 2

Plot file version 16 created 07-OCT-2006 21:44:27

16 EVLA:W6 IF 1R

1500 1400 1300 1200 1100 1000

16 EVLA:W6 IF 1L

1600 1500 1400 1300 1200 1100 1000

16 EVLA:W6 IF 2R

MilliGain

1400 1300 1200 1100 1000 900 16 EVLA:W6 IF 2L

TIME (HOURS)

06 10 20 30 40 50 07 00 10 20 30

1400 1300 1200 1100 1000 900