R-L phase diff vs IAT time for 20061005.L BAND.1 SN 2 IF 1 - 2

Plot file version 6 created 07-OCT-2006 15:55:27

3D VLA: E2 IF 1 4 2 0 -2 -4 -6 3D VLA: E2 IF 2 6 4 2 0 -2 -4 -6 5D VLA: W2 IF 1

Degrees

4 2 0 -2 -4 -6 -8 5D VLA: W2 IF 2

TIME (HOURS)

11 36 38 40 42 44 46

6 4 2 0 -2 -4 -6