Tant vs IAT time for 20061001.C BAND.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 1 created 02-OCT-2006 08:37:19

9 VLA: N8 IF 1R

52.5

52.0

51.5

9 VLA: N8 IF 1L

49.4 49.2 49.0 48.8

9 VLA: N8 IF 2R

53.5

53.0

52.5

9 VLA: N8 IF 2L

51.8 51.6 51.4 51.2 51.0

10 VLA: E8 IF 1R

Kelvin

64.8 64.6 64.4 64.2 64.0 63.8

10 VLA: E8 IF 1L

45.0 44.8 44.6

10 VLA: E8 IF 2R

66.0

65.5

10 VLA: E8 IF 2L

TIME (HOURS)

18 00 05 10 15 20 25 30

48.6

48.4

48.2

Tant vs IAT time for 20061001.C BAND.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 2 created 02-OCT-2006 08:37:19

13 EVLA:N16 IF 1R 80 60 40 13 EVLA:N16 IF 1L 120 100 80 60 40 20 13 EVLA:N16 IF 2R 32 31 30 13 EVLA:N16 IF 2L 30 29 28 14 EVLA:E10 IF 1R

Kelvin

70 60 50 40 30 14 EVLA:E10 IF 1L 150 100 50 14 EVLA:E10 IF 2R 100 80 60 40 14 EVLA:E10 IF 2L

TIME (HOURS)

18 00 05 10 15 20 25 30

32 31 30 29

Tant vs IAT time for 20061001.C BAND.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 3 created 02-OCT-2006 08:37:19

15 VLA: E4 IF 1R

65.4 65.2 65.0 64.8 64.6 64.4 15 VLA: E4 IF 1L

46.4 46.2 46.0 45.8 45.6

15 VLA: E4 IF 2R

75.2 75.0 74.8 74.6 74.4 74.2

15 VLA: E4 IF 2L 56 54 52 16 EVLA:W6 IF 1R

Kelvin

80 60 40 20 16 EVLA:W6 IF 1L 60 40 20 16 EVLA:W6 IF 2R 33 32 31 30 16 EVLA:W6 IF 2L

TIME (HOURS)

18 00 05 10 15 20 25 30

60 40 20

Tant vs IAT time for 20061001.C BAND.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 4 created 02-OCT-2006 08:37:19

17 VLA: E6 IF 1R

63.6 63.4 63.2 63.0

17 VLA: E6 IF 1L

70.6 70.4 70.2 70.0 69.8 17 VLA: E6 IF 2R

61.5

61.0

60.5

17 VLA: E6 IF 2L 58 56 54 18 EVLA:N4 IF 1R

Kelvin

150 100 50 18 EVLA:N4 IF 1L 150 100 50 18 EVLA:N4 IF 2R 100 80 60 18 EVLA:N4 IF 2L

TIME (HOURS)

18 00 05 10 15 20 25 30

50 48 46 44 42

Tant vs IAT time for 20061001.C BAND.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 5 created 02-OCT-2006 08:37:19

24 EVLA:W14 IF 1R 150 100 50 24 EVLA:W14 IF 1L 75 70 65 60 55 24 EVLA:W14 IF 2R 75 70 65 60 24 EVLA:W14 IF 2L 80 70 60 50 26 EVLA:OUT IF 1R

Kelvin

4.09000

26 EVLA:OUT IF 1L 3.92000

26 EVLA:OUT IF 2R 3.93000

26 EVLA:OUT IF 2L

TIME (HOURS)

18 00 05 10 15 20 25 30

3.99000