R/L amp ratio vs IAT time for 0542+498.CALIB.1 SN 1 IF 1

Plot file version 14 created 27-JUL-2006 13:11:36

13R/L EVLA:W12 1010

1000 990 980 14R/L EVLA:N16 1010 1005 1000 995 990 985 15R/L VLA: E4

MilliRatio

1005 1000 995 990 985 980 975 16R/L EVLA:E24

TIME (HOURS)

13 30 14 00 30 15 00 30 16 00 30

1010 1005 1000 995 990 985