Plot file version 1 created 06-NOV-2025 14:46:36 Amplitude vs UV distance for GEO.FQ-1.1 Source:J0136+47 Ants * - * Stokes I IF# 1 - 8 Chan# 1 - 256 Nchav 256

Freq = 15.0960 GHz, Bw = 32.000 MHz

Janskys

Mega Wavelengths

0 50 100 150 200 250 300 350 400 450

9876543210