Cable Cal vs UTC time for UL005C_1.UVDATA.1 PC 1 NTONE 1 Rpol & Lpol IF 1

Plot file version 32 created 25-FEB-2020 14:15:02

1R BR 560 540 520 500 2R FD 780 770 760 750 3R HN 535 530 525 4R KP 70 60 50 5R LA 895 890 885 880 6R MK

Pico Seconds

790 780 770 7R NL 470 465 460 8R OV 800 600 400 200 9R PT 530 520 510 10R SC

Time (hours)

17 18 19 20 21 22

825 820 815 810 805