CONT: J0924+42 ???? 1615.500 MHz J0924BL.POLI.1

Plot file version 4 created 19-AUG-2016 11:21:26

Grey scale flux range= -30.00 30.00 rad/m/m

GREY: J0924+42 J0924BL.rmBL.1

Peak contour flux = 4.6448E-03 Jy/beam Levs = 1.768E-04 * (-1, 1, 1.414, 2, 2.828, 4, 5.657, 8, 11.31, 16, 22.63, 32, 45.25, 64, 90.51, 128, 181.0, 256, 362.0, 512, 724.1, 1020, 1450, 2050, 2900, 4100, 5790, 8190, 11590, 16380)

Declination (J2000)

Right Ascension (J2000) Pol line 1 arcsec = 6.6667E-01 Jy/beam