Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 1 created 07-MAR-2011 17:21:08

1 BR IF 1R 250 248 246 244 1 BR IF 1L 254 252 250 248 1 BR IF 2R 50 48 46 44 1 BR IF 2L 50 48 46 44 42 1 BR IF 3R

Degrees

16 14 12 1 BR IF 3L 164 162 160 158 1 BR IF 4R 286 284 282 280 1 BR IF 4L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

136 134 132 130 128

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 2 created 07-MAR-2011 17:21:08

1 BR IF 5R

-112 -114 -116 -118 1 BR IF 5L -38 -40 -42 -44 1 BR IF 6R 52 50 48 46 1 BR IF 6L -24 -26 -28 -30 1 BR IF 7R

Degrees

-46 -48 -50 -52 1 BR IF 7L 184 182 180 178 1 BR IF 8R 348 346 344 342 1 BR IF 8L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

114 112 110 108

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 3 created 07-MAR-2011 17:21:08

2 FD IF 1R 175 170 165 160 155 2 FD IF 1L 175 170 165 160 155 2 FD IF 2R -50 -60 -70 2 FD IF 2L 310 305 300 295 2 FD IF 3R

Degrees

160 150 140 2 FD IF 3L

-130

-140

-150 2 FD IF 4R -30 -40 -50 2 FD IF 4L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

-105 -110 -115 -120

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 4 created 07-MAR-2011 17:21:08

2 FD IF 5R -85 -90 -95 -100

2 FD IF 5L 170 160 150 2 FD IF 6R

-150 -155 -160 -165

2 FD IF 6L -45 -50 -55 -60 2 FD IF 7R

Degrees

-135 -140 -145 -150

2 FD IF 7L

-150 -155 -160 -165

2 FD IF 8R

-105 -110 -115 -120

2 FD IF 8L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

270 265 260 255

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 5 created 07-MAR-2011 17:21:08

3 HN IF 1R 265 260 255 250 3 HN IF 1L 0 -5 -10 3 HN IF 2R

-115 -120 -125

3 HN IF 2L 150 145 140 135 3 HN IF 3R

Degrees

290 285 280 275 3 HN IF 3L 155 150 145 140 3 HN IF 4R

-130 -135 -140 -145

3 HN IF 4L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

0 -5 -10

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 6 created 07-MAR-2011 17:21:08

3 HN IF 5R 130 125 120 115 3 HN IF 5L -75 -80 -85 3 HN IF 6R 30 25 20 15 3 HN IF 6L

-130 -135 -140 -145

3 HN IF 7R

Degrees

60 55 50 45 3 HN IF 7L -65 -70 -75 -80 3 HN IF 8R 95 90 85 80 3 HN IF 8L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

-140 -145 -150

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 7 created 07-MAR-2011 17:21:08

4 KP IF 1R

-130 -135 -140 -145

4 KP IF 1L -45 -50 -55 4 KP IF 2R 310 305 300 295 4 KP IF 2L

-135 -140 -145 -150

4 KP IF 3R

Degrees

105 100 95 90 4 KP IF 3L

-100 -105 -110 -115

4 KP IF 4R 70 65 60 4 KP IF 4L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

-80 -85 -90 -95

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 8 created 07-MAR-2011 17:21:08

4 KP IF 5R 155 150 145 4 KP IF 5L 10 5 0 4 KP IF 6R 30 25 20 15 4 KP IF 6L 170 165 160 155 4 KP IF 7R

Degrees

-140 -145 -150 -155

4 KP IF 7L

-115 -120 -125 -130

4 KP IF 8R -35 -40 -45 -50 4 KP IF 8L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

295 290 285 280

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 9 created 07-MAR-2011 17:21:08

5 LA IF 1R 50 45 40 35 5 LA IF 1L 65 60 55 50 5 LA IF 2R 120 100 80 60 5 LA IF 2L 165 160 155 150 5 LA IF 3R

Degrees

125 120 115 110 105 5 LA IF 3L 165 160 155 150 145 5 LA IF 4R 105 100 95 90 85 5 LA IF 4L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

70 60 50

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 10 created 07-MAR-2011 17:21:08

5 LA IF 5R 30 25 20 15 5 LA IF 5L 115 110 105 100 5 LA IF 6R

-155 -160 -165 -170 -175

5 LA IF 6L 115 110 105 100 5 LA IF 7R

Degrees

280 275 270 265 5 LA IF 7L -85 -90 -95 5 LA IF 8R -45 -50 -55 -60 5 LA IF 8L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

325 320 315 310

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 11 created 07-MAR-2011 17:21:08

6 MK IF 1R 180 170 160 6 MK IF 1L

-110 -120 -130

6 MK IF 2R 90 80 70 6 MK IF 2L 20 10 0 6 MK IF 3R

Degrees

355 350 345 340 335 6 MK IF 3L 260 250 240 6 MK IF 4R -90 -100 -110

6 MK IF 4L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

-20 -30 -40

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 12 created 07-MAR-2011 17:21:08

6 MK IF 5R 195 190 185 180 175 6 MK IF 5L -90 -100

-110

6 MK IF 6R 70 60 50 6 MK IF 6L 355 350 345 340 335 6 MK IF 7R

Degrees

345 340 335 330 325 6 MK IF 7L 170 160 150 6 MK IF 8R -85 -90 -95 -100 -105

6 MK IF 8L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

90 80 70

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 15 created 07-MAR-2011 17:21:08

8 OV IF 1R 320 315 310 8 OV IF 1L 0 -5 -10 8 OV IF 2R 250 245 240 235 8 OV IF 2L

-150 -155 -160 -165 8 OV IF 3R

Degrees

-155 -160 -165 -170 8 OV IF 3L 30 25 20 15 8 OV IF 4R 15 10 5 0 8 OV IF 4L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

180 175 170 165

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 16 created 07-MAR-2011 17:21:08

8 OV IF 5R 235 230 225 220 8 OV IF 5L

-145 -150 -155

8 OV IF 6R 340 335 330 325 8 OV IF 6L -5 -10 -15 -20 8 OV IF 7R

Degrees

-80 -85 -90 -95 8 OV IF 7L -35 -40 -45 8 OV IF 8R -65 -70 -75 -80 8 OV IF 8L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

245 240 235

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 17 created 07-MAR-2011 17:21:08

9 PT IF 1R 100 50 0 -50 9 PT IF 1L -20 -40 -60 9 PT IF 2R 330 325 320 9 PT IF 2L 70 65 60 9 PT IF 3R

Degrees

-20 -40 -60 -80 9 PT IF 3L -5 -10 -15 -20 9 PT IF 4R 130 125 120 115 9 PT IF 4L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

70 65 60 55

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 18 created 07-MAR-2011 17:21:08

9 PT IF 5R 300 295 290 9 PT IF 5L -15 -20 -25 -30 9 PT IF 6R 125 120 115 9 PT IF 6L 80 75 70 9 PT IF 7R

Degrees

135 130 125 9 PT IF 7L 10 5 0 9 PT IF 8R -70 -75 -80 9 PT IF 8L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

55 50 45 40

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 19 created 07-MAR-2011 17:21:08

10 SC IF 1R 50 45 40 35 10 SC IF 1L 120 115 110 105 10 SC IF 2R

-115 -120 -125

10 SC IF 2L 185 180 175 170 10 SC IF 3R

Degrees

-40 -45 -50 10 SC IF 3L 125 120 115 10 SC IF 4R 340 335 330 325 10 SC IF 4L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

165 160 155

Phase-cal Phase vs UTC time for BL149DB.UVDATA.1 PC 1 Rpol & Lpol IF 1 - 8 Phase tone 1

Plot file version 20 created 07-MAR-2011 17:21:08

10 SC IF 5R -90 -95 -100 -105

10 SC IF 5L -40 -45 -50 10 SC IF 6R 30 25 20 15 10 SC IF 6L -20 -25 -30 -35 10 SC IF 7R

Degrees

135 130 125 10 SC IF 7L 185 180 175 170 10 SC IF 8R 165 160 155 150 10 SC IF 8L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

110 105 100 95