Delay vs UTC time for BB255B.UVDATA.1 CL 2 Rpol IF 2

Plot file version 1 created 26-NOV-2009 13:42:46

1R BR 0.0 -0.2 -0.4

2R EB 0.3 0.2 0.1 3R FD 0.1 0.0 -0.1

4R GB 0.0 -0.5 -1.0

5R HN 0.0 -0.2 -0.4

6R KP 0.0 -0.5 -1.0

7R LA

Nano Seconds

0.0 -0.2 -0.4 -0.6

8R MK 0.2 0.0 -0.2 -0.4 -0.6 9R OV 0.0 -0.2 -0.4 -0.6

10R PT

0.10 0.08 0.06

11R SC

-0.5 -1.0

12R Y

TIME (HOURS)

22 1/00 1/02 1/04 1/06

0.0 -0.2 -0.4-0.6 -0.8