IF 2- 2 CH 129- 129 STK I CC ver 0

Closure Phase vs Time for 20090714.C BAND.1

PLot file version 12 created 27-JUL-2009 08:29:54

10 5 0 -5

N16-W04-N02 18-19-25

Degrees

8 6 4 2 0 -2 -4 -6

E18-W14-N02 23-24-25

IF 2- 2 CH 129- 129 STK I CC ver 0

Closure Amplitude vs Time for 20090714.C BAND.1

PLot file version 14 created 27-JUL-2009 08:33:58

1200

1100

1000 900

W16-E02-E16-W14 1-2-3-24

1200 1150 1100 1050 1000 950 900

W16-E02-E16-N02 1-2-3-25