Gain amp vs UTC time for 242D_ASTRO.UV.1 SN 2 Lpol IF 1 - 8

Plot file version 1 created 21-APR-2009 12:53:14

7L MK 1020

1000 980 960 940 8L NL

MilliGain

1000 950 900

9L OV

TIME (HOURS)

20 22 1/00 1/02 1/04 1/06

1080 1060 1040 1020 1000 980 960 940 920