Plot file version 33 created 07-DEC-2008 22:48:55 DFT vs Time for SA43 EL15 F1.APR1.1 From 0/09:30:36 to 0/15:23:37 UVrange 0.0000E+00 1.4000E+08 wavelengths Corr Ipol Channel 1 I - 1 Freq = 43.2175 GHz

Janskys

TIME (HOURS)

10 11 12 13 14 15

2.5

2.0

1.5

1.0

0.5

0.0

-0.5

-1.0

-1.5

-2.0