CONT: 21427+43 SEQ.NUM. 1.000 IPOL SSCYG.MCUBE.1

PLot file version 1 created 03-MAY-2007 08:16:50

Cont peak flux = 1.1362E-03 JY/BEAM Levs = 1.920E-05 * (-4, -2.83, 2.828, 4, 5.657, 8, 11.31, 16, 22.63, 32, 45.25, 64, 90.51, 128, 181.0, 256, 362.0, 512, 724.1, 1024)

43 35 45 30 15 00 34 45

1 2

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

21 42 45 44 43 42 41 40 39

43 35 45 30 15 00 34 45

3 4