Gain amp vs IAT time for NIRUJ.UVCOP.1 SN 5 Rpol IF 1

Plot file version 1 created 21-SEP-2001 15:28:33

1R VLA:W64 1.1 1.0 0.9 2R VLA:N24

1.04 1.02 1.00 0.98 0.96

3R VLA:N40

1.05 1.00 0.95 0.90 4R VLA:N16 1.1 1.0 0.9 5R VLA:N56

Gain

1.8 1.6 1.4 1.2 1.0 6R VLA:E8

0.98 0.96 0.94 0.92

7R VLA:E16

1.06 1.04 1.02 1.00 0.98 8R VLA:N8 0.94 0.92 0.90

9R VLA:E64

TIME (HOURS)

11 30 40 50 12 00 10 20 30

1.05 1.00 0.95 0.90

Gain amp vs IAT time for NIRUJ.UVCOP.1 SN 5 Rpol IF 1

Plot file version 2 created 21-SEP-2001 15:28:33

10R VLA:W56 1.1 1.0 0.9 11R VLA:N72 1.1 1.0 0.9 12R VLA:E56 1.05 1.00 0.95 13R VLA:W72

1.10 1.05 1.00 0.95

14R VLA:E32

Gain

1.05 1.00 0.95 15R VLA:N48

1.05 1.00 0.95 16R VLA:W48

1.10 1.05 1.00 0.95 17R VLA:W32 1.1 1.0 0.9 18R VLA:N32

TIME (HOURS)

11 30 40 50 12 00 10 20 30

1.05 1.00 0.95

Gain amp vs IAT time for NIRUJ.UVCOP.1 SN 5 Rpol IF 1

Plot file version 3 created 21-SEP-2001 15:28:33

19R VLA:E24 1.05 1.00 0.95 20R VLA:E72 1.1 1.0 0.9 21R VLA:W40 1.1 1.0 0.9 22R VLA:W8

1.05 1.00 0.95 23R VLA:W16

Gain

1.05 1.00 0.95 25R VLA:W24

1.05 1.00 0.95 26R VLA:E48

1.10 1.05 1.00 0.95 27R VLA:N64 1.1 1.0 0.9 28R VLA:E40

TIME (HOURS)

11 30 40 50 12 00 10 20 30

1.05 1.00 0.95